0500

1000

1500

2000

2500

3000

3500

4000

4500

5000

5500

6000 0 500 1000 40

40

41

41

42

42

43

43

44

44

44.5

44.5

45

45

45.1

45.1

45.2

45.2

45.3

45.3

45.4

45.4

45.5

45.5

45.6

45.6

45.65

45.65

45.7

45.7

45.72

45.72

45.74

45.74

45.76

45.76

45.78

45.78

45.8

45.8

45.82

45.82

45.84

45.84

Sigma4 for P08S 130E

km Lat

252321191715131197531

40.00

43.00

44.00

45.00

45.50

45.80

2 4 6 8