120˚E

120˚E

130˚E

130˚E

140˚E

140˚E

150˚E

150˚E

160˚E

160˚E

10˚S 10˚S

0˚ 0˚

10˚N 10˚N

20˚N 20˚N

30˚N 30˚N

40˚N 40˚N

.5 .10 .15 .20 .25 .30

.35

.40

.45

.50

.55

.60

.65

.70

.75

.80

.85 .90

Station locations for p10