0500

1000

1500

2000

2500

3000

3500

4000

4500

5000

5500

6000 0 200 400 600 800 1000 1200

43 44 44.5

45 45.1 45.2 45.3

45.4

45.5

45.6

45.65

45.7 45.72 45.74 45.76 45.78

45.8

45.82

45.82

45.84

45.86

Sigma4 for P17NE Gulf of Alaska

km Lon

123125127129131133135137139141143145147

40.00

43.00

44.00

45.00

45.50

45.80

-154 -152 -150 -148 -146 -144 -142 -140 -138 -136