0500

1000

1500

2000

2500

3000

3500

4000

4500

5000

5500

6000 0 200 400 600 800 1000 1200

1.2

1.4

1.6

1.8

2

2.2 2.4 2.6 2.8 3 3.2 3.4 3.6

3.8

3.8 4 4 4.2

4.4 4.6 4.8 5 67 8

Theta (C) for P17NE Gulf of Alaska

km Lon

123125127129131133135137139141143145147

-1.5-1.00.01.02.03.04.05.0

10.0

15.0

20.0

25.0

30.0

31.0

-154 -152 -150 -148 -146 -144 -142 -140 -138 -136