180˚

180˚

170˚W

170˚W

160˚W

160˚W

150˚W

150˚W

140˚W

140˚W

130˚W

130˚W

120˚W

120˚W

110˚W

110˚W

100˚W

100˚W

90˚W

90˚W

80˚W

80˚W

70˚W

70˚W

60˚W

60˚W

70˚S 70˚S

60˚S 60˚S

50˚S 50˚S

40˚S 40˚S

30˚S 30˚S

20˚S 20˚S

10˚S 10˚S

0˚ 0˚

10˚N 10˚N

20˚N 20˚N

30˚N 30˚N

40˚N 40˚N

50˚N 50˚N

.9.18.28.38.48.58.68.78.88.98.108.118.128.138.148.158.168.178.188

Station locations for P18