170˚E

170˚E

180˚

180˚

170˚W

170˚W

160˚W

160˚W

150˚W

150˚W

140˚W

140˚W

20˚S 20˚S

10˚S 10˚S

0˚ 0˚

.0005

.0010

.0015

.0020

.0025

.0030

.0035

.0040

.0045

.0050

.0055

.0060

.0065

.0070

.0075

.0080

.0085

.0090

Station locations for p31