0˚

10˚E

20˚E

30˚E

40˚E

50˚E

60˚E

70˚E

80˚E

90˚E

100˚E

110˚E

120˚E

130˚E

140˚E

150˚E

160˚E

170˚E

180˚

170˚W

160˚W

150˚W

140˚W

130˚W

120˚W

110˚W

100˚W

90˚W

80˚W

70˚W

60˚W

50˚W

40˚W

30˚W

20˚W

10˚W

.0691

.0701

.0710

.0720

.0730

.0740

.0750

.0760

.0770

.0780

.0790

Station locations for S04